<script lang="ts">
export default {}
</script>

<template>
  <article class="prose prose-invert bg-ctp-crust rounded-lg mx-auto p-8 pt-10 text-white">
    <h1>Privacy Policy</h1>
    <p>
      It's.... kind of empty here.

      <br /><br />

      No logs are kept by SafeTwitch, however instances may log requests with their reverse-proxy.
      The following data is stored in your browser from using the site, however never goes outside your browser:
      <ul>
        <li>Selected settings</li>
        <li>Followed streamers</li>
      </ul>

      The following data is sent outside of your browser to SafeTwitch's backend:
      <ul>
        <li>Language locale</li>
      </ul>
      The language locale is sent to SafeTwitch's backend per request, and is used to fetch the data from Twitch in the correct language


      <br /><br />

      Non-official instances are under their own privacy policy, as they may host SafeTwitch with
      different practices that may log requests
    </p>
  </article>
</template>
